     The connect command has several modes:

     C port call
     C node

     C[onnect] [port] [callsign] [<digipeater> . . .]

     to connect to station 'callsign' on interface 'port',
     possibly via digipeaters 'digipeater...' (note the lack of 'via'!)
     Use the 'P' command to see existing ports of the system

     C[onnect] [node]

     to connect over netrom to a remote node with 'node'
     as either node-call or node-alias


